5 10 15 1

2

3 = 5.02 TeV NNs Pb −p ALICE

5 10 15

1

2

3

5 10 15

1

2

3 *0K_{0-10% / 40-100%}

10-40% / 40-100%

)c (GeV/ Tp 5 10 15

1

2

3

5 10 15

1

2

3 ϕ 0-10% / 40-100% 10-40% / 40-100%

5 10 15

1

1.5 2 < -0.9 y -1.2 <

5 10 15

1

1.5

2 < -0.6 y -0.9 <

(GeV/c) Tp 5 10 15

1

1.5 2 < -0.3 y -0.6 <

5 10 15

1

1.5 2 < 0.0 y -0.3 <

5 10 15

1

1.5 2 < 0.3 y 0.0 < CP Q

ALI-PUB-561607

ALI-PUB-561607